\hypertarget{appstate_8h_source}{}\doxysection{appstate.\+h}
\label{appstate_8h_source}\index{inc/appstate.h@{inc/appstate.h}}
\mbox{\hyperlink{appstate_8h}{Go to the documentation of this file.}}
\begin{DoxyCode}{0}
\DoxyCodeLine{1 \textcolor{preprocessor}{\#pragma once}}
\DoxyCodeLine{2 \textcolor{keyword}{typedef} \textcolor{keyword}{struct }\mbox{\hyperlink{structAppState}{AppState}}}
\DoxyCodeLine{3 \{}
\DoxyCodeLine{4     \textcolor{keyword}{volatile} \textcolor{keywordtype}{int} \mbox{\hyperlink{structAppState_aa079c42bd62ba8afab5455777a89c30a}{keepRunning}};}
\DoxyCodeLine{5     \textcolor{keyword}{volatile} \textcolor{keywordtype}{unsigned} \textcolor{keywordtype}{int} \mbox{\hyperlink{structAppState_adced11680743943fc3a51bbaed6962ef}{columns}};}
\DoxyCodeLine{6 \} \mbox{\hyperlink{appstate_8h_a20ef834769d47c2d37c444681671b252}{AppState}};}

\end{DoxyCode}
